0h 2h 4h 6h 8h 10h 12h 14h 16h 18h 20h 22h 0h

0h 2h 4h 6h 8h 10h 12h 14h 16h 18h 20h 22h 0h

−90° −75° −60° −45° −30° −15° 0° +15° +30° +45° +60° +75° +90°

−90° −75° −60° −45° −30° −15° 0° +15° +30° +45° +60° +75° +90°

10 100 1000 10000 sec

ROSAT All-Sky Survey

Exposure Map - 2nd Processing